X-Git-Url: http://git.rohieb.name/bachelor-thesis/written-stuff.git/blobdiff_plain/df75c351fb7b1deeb49fa444b1bef90e13c76290..0a16958f32cf52f244d57f1627ebde68f1134757:/Ausarbeitung/experiment2.tex

diff --git a/Ausarbeitung/experiment2.tex b/Ausarbeitung/experiment2.tex
index c575e4d..4dc3386 100644
--- a/Ausarbeitung/experiment2.tex
+++ b/Ausarbeitung/experiment2.tex
@@ -1,13 +1,17 @@
 \chapter{Experiment 2: Movement Behaviour with Mean Correction}
-\todo
+\todo{}
 
 \section{Setup}
 Fit function from data in experiment 1; algorithm determined target value for
 distance from fit function and input distance and input velocity.
 
+approach: correct imprecise measurement
+
 Setup was the same as in experiment 1. Application on netbook was
 "`mean\_correction\_test"', same procedure as in first experiment.
 
+expectations \& were they fulfilled?
+
 \section{Results}
 \begin{figure}
  \centering
@@ -31,5 +35,6 @@ Setup was the same as in experiment 1. Application on netbook was
 \end{figure}
 
 results better than in experiment 1, very accurate for laminate floor, carpet
-floor more spread but still kind of in the middle and less deviation.
+floor more spread but still kind of in the middle and less deviation from ideal
+value.
 \todo{statistical values, stddev?}
