X-Git-Url: http://git.rohieb.name/bachelor-thesis/written-stuff.git/blobdiff_plain/e5a80049436ec5679c4283e096308abda9e05ca5..31c576ac200aa443984d141a393893acff4787e5:/Ausarbeitung/experiment2.tex?ds=sidebyside

diff --git a/Ausarbeitung/experiment2.tex b/Ausarbeitung/experiment2.tex
index ba75ff5..27d12a3 100644
--- a/Ausarbeitung/experiment2.tex
+++ b/Ausarbeitung/experiment2.tex
@@ -22,7 +22,7 @@ target distance or angle.
 
 \section{Setup}
 The hardware setup was exactly the same as in Experiment 1. However, in this
-experiment the application \cmd{mean\_correction\_test} was used to measure
+experiment the application \prog{mean\_correction\_test} was used to measure
 data. It did exactly the same as the application from Experiment 1, except that
 it adapted the target distance resp. target angle according to the algorithm
 described above.
