X-Git-Url: https://git.rohieb.name/bachelor-thesis/written-stuff.git/blobdiff_plain/62959cd738864c5fc8222f36b5f4927fff6c4318..e29146877ebf1c77b2b31ad1fa804547286b2a21:/Ausarbeitung/implementation.tex

diff --git a/Ausarbeitung/implementation.tex b/Ausarbeitung/implementation.tex
index 66c7a3d..64e3a44 100644
--- a/Ausarbeitung/implementation.tex
+++ b/Ausarbeitung/implementation.tex
@@ -1,9 +1,13 @@
-\chapter{Description of Implementation}
+\chapter{Implementation}
+
+\todo{?}
+This chapter describes the implementation that was used for the aforementioned
+experiments. It consists of the measuring program itself, as well as several
+scripts to help with analysis of the measured data.
+
 \section{Measuring}
 \label{sec:impl:measuring}
 
-\todo{}
-
 C++ code in wiselib/trunk/pc\_apps/roomba\_tests
 
 three single applications with same base: roomba\_test (main.cc),
