X-Git-Url: https://git.rohieb.name/bachelor-thesis/written-stuff.git/blobdiff_plain/cbbf1119f4b08f1a8d8eef497380c589778c5068..HEAD:/Ausarbeitung/acronyms.tex

diff --git a/Ausarbeitung/acronyms.tex b/Ausarbeitung/acronyms.tex
index a347905..73e25af 100644
--- a/Ausarbeitung/acronyms.tex
+++ b/Ausarbeitung/acronyms.tex
@@ -1,5 +1,5 @@
 \chapter*{Table of Acronyms}
-\begin{acronym}[opcode]
+\begin{acronym}[CDROM]
   \acro{8N1}{8 data bits, no parity, 1 start/stop bit}
   \acro{CDROM}{Compact Disc Read Only Memory}
   \acro{DC}{Direct Current}
