X-Git-Url: https://git.rohieb.name/openwrt.git/blobdiff_plain/94789fd24524b141ccfed0919d3bb839372140c7..f20b056795ca61a353c1614901311d3308ca70db:/docs/network.tex?ds=sidebyside

diff --git a/docs/network.tex b/docs/network.tex
index 793a39822..e4efd8df9 100644
--- a/docs/network.tex
+++ b/docs/network.tex
@@ -1,4 +1,4 @@
-The network configuration in Kamikaze is stored in \texttt{/etc/config/network}
+The network configuration is stored in \texttt{/etc/config/network}
 and is divided into interface configurations.
 Each interface configuration either refers directly to an ethernet/wifi
 interface (\texttt{eth0}, \texttt{wl0}, ..) or to a bridge containing multiple interfaces.
