X-Git-Url: https://git.rohieb.name/openwrt.git/blobdiff_plain/a039e7c2954127b266e531891688e4d65da41f65..ddade98e1046a6c701d0a96d97fb870d01c8c052:/docs/wireless.tex

diff --git a/docs/wireless.tex b/docs/wireless.tex
index e6a81b840..7a7d528e8 100644
--- a/docs/wireless.tex
+++ b/docs/wireless.tex
@@ -36,7 +36,7 @@ config wifi-iface
     option encryption   "none"
 \end{Verbatim}
 
-\paragraph{Generic multi-radio Atheros wireless conifg:}
+\paragraph{Generic multi-radio Atheros wireless config:}
 
 \begin{Verbatim}
 config wifi-device  wifi0
