X-Git-Url: https://git.rohieb.name/openwrt.git/blobdiff_plain/c7960102d52cbf0f389e7cbbb6c36df786990291..6537899d511da8a3c53bb06b18de0b118d5d9584:/docs/bugs.tex?ds=sidebyside

diff --git a/docs/bugs.tex b/docs/bugs.tex
index ed2535d21..9c46b5a7e 100644
--- a/docs/bugs.tex
+++ b/docs/bugs.tex
@@ -45,7 +45,7 @@ A ticket might be closed by a developer because:
 \item the problem cannot be reproduced by the developers (worksforme)
 \end{itemize}
 
-A the same time, the reporter may want to get the ticket closed since he is not 
+At the same time, the reporter may want to get the ticket closed since he is not 
 longer able to trigger the bug, or found it invalid by himself.
 
 When a ticket is closed by a developer and marked as "fixed", the comment contains 
