X-Git-Url: https://git.rohieb.name/openwrt.git/blobdiff_plain/d38e13b12b10060e210d7c5ace366cc82eaf9da9..c4f52d9cbc91c855be47e29a8909684d03e9c74f:/docs/openwrt.tex?ds=sidebyside

diff --git a/docs/openwrt.tex b/docs/openwrt.tex
index e63eac3f2..07098b329 100644
--- a/docs/openwrt.tex
+++ b/docs/openwrt.tex
@@ -4,14 +4,11 @@
 \usepackage[T1]{fontenc}
 \usepackage{ae,aecompl,aeguill}
 \usepackage{fancyvrb}
-
 \setlength{\parindent}{0pt}
 \setlength{\parskip}\medskipamount
 
 \begin{document}
-
 \tableofcontents
-
 \chapter{The Router}
   \section{Getting started}
     \subsection{Installation}
@@ -39,5 +36,4 @@
   \section{Debugging and debricking}
     \subsection{Adding a serial port}
     \subsection{JTAG}
-
 \end{document}
