X-Git-Url: https://git.rohieb.name/openwrt.git/blobdiff_plain/dfe52f0a791b7f715dabfc7c64c08a7d2d423e8b..120581a484b69cc3c46c3034b556ea55c8106720:/docs/config.tex?ds=inline

diff --git a/docs/config.tex b/docs/config.tex
index 44b6689b5..acb4bdf85 100644
--- a/docs/config.tex
+++ b/docs/config.tex
@@ -9,8 +9,8 @@ it was written under.
 Syntax:
 
 \begin{Verbatim}
-config    <type> [<name>]	     # Section
-  option  <name>  <value>      # Option
+config      <type> [<name>]	     # Section
+    option  <name>  <value>      # Option
 \end{Verbatim}
 
 Every parameter needs to be a single string and is formatted exactly
